Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV2883

J œm H œm Ks œm JD � 2445000 Phase

10.630 0.016 10.295 0.019 10.171 0.026 4344.56 0.640 10.919 0.066 10.431 0.053 10.281 0.052 4410.56 0.242 10.674 0.041 10.364 0.023 10.255 0.030 4666.57 0.578 10.646 0.028 10.283 0.017 10.209 0.020 4669.57 0.606 10.507 0.018 10.160 0.018 10.077 0.016 4676.72 0.671 11.002 0.040 10.561 0.040 10.410 0.041 4963.87 0.291 11.004 0.040 10.568 0.041 10.402 0.040 4967.87 0.327 10.419 0.024 9.995 0.028 9.799 0.029 5034.62 0.936 10.903 0.018 10.396 0.027 10.240 0.027 5061.73 0.184 10.916 0.033 10.539 0.017 .... .... 5085.71 0.402 10.862 0.031 10.515 0.026 10.395 0.031 5087.80 0.422 10.402 0.030 10.010 0.030 9.871 0.039 5121.69 0.731 10.390 0.021 9.968 0.017 9.833 0.021 5126.64 0.776 10.323 0.015 9.903 0.017 9.769 0.015 5351.80 0.830 10.677 0.025 10.179 0.026 10.033 0.025 5376.84 0.059 10.731 0.033 10.248 0.021 10.096 0.022 5379.86 0.086 10.923 0.015 10.532 0.016 10.418 0.019 5408.82 0.351