Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV5497

J œm H œm Ks œm JD � 2445000 Phase

10.246 0.040 9.760 0.045 9.640 0.045 4289.79 0.244 9.932 0.016 9.524 0.016 9.366 0.024 4344.58 0.796 9.988 0.040 9.541 0.021 9.407 0.028 4666.56 0.042 10.052 0.025 9.592 0.021 9.444 0.017 4670.85 0.085 10.109 0.020 9.662 0.015 9.509 0.017 4676.73 0.144 10.047 0.042 9.556 0.040 9.444 0.041 4963.92 0.040 10.058 0.021 9.680 0.032 9.551 0.033 5004.88 0.452 9.941 0.028 9.513 0.029 9.400 0.041 5030.85 0.714 9.993 0.015 9.516 0.016 9.401 0.033 5059.69 0.005 10.149 0.036 .... .... 9.569 0.016 5083.68 0.247 10.102 0.032 9.717 0.016 9.581 0.022 5085.89 0.269 10.127 0.031 9.732 0.026 9.585 0.031 5087.82 0.289 10.157 0.019 9.753 0.024 9.612 0.034 5092.80 0.339 9.965 0.031 9.574 0.030 9.428 0.040 5121.70 0.630 9.964 0.021 9.562 0.016 9.429 0.021 5126.65 0.680 9.975 0.016 9.509 0.017 9.377 0.015 5351.80 0.950 10.182 0.052 9.700 0.052 9.559 0.052 5375.89 0.192 10.170 0.036 9.687 0.021 9.552 0.026 5378.84 0.222 10.018 0.015 9.628 0.016 9.498 0.017 5408.82 0.524 10.014 0.015 9.616 0.016 .... .... 5408.83 0.524 9.972 0.021 9.582 0.022 9.457 0.024 5414.80 0.585 9.908 0.021 9.469 0.018 9.347 0.017 5444.67 0.886 9.949 0.015 9.498 0.021 9.359 0.016 5446.75 0.907