Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV5541

J œm H œm Ks œm JD � 2445000 Phase

15.006 0.028 14.666 0.075 14.571 0.037 4344.58 0.753 15.117 0.030 14.822 0.019 14.781 0.058 4642.82 0.944 14.982 0.026 14.749 0.035 14.740 0.034 4645.88 0.084 15.018 0.025 14.723 0.027 14.610 0.034 5001.80 0.780 14.840 0.056 14.651 0.060 14.559 0.058 5026.84 0.116 14.908 0.027 14.588 0.037 14.562 0.052 5027.84 0.488 14.964 0.035 14.646 0.036 14.549 0.053 5030.84 0.606 14.807 0.047 14.604 0.061 14.540 0.055 5032.81 0.341 15.115 0.033 14.779 0.060 .... .... 5055.77 0.900 14.985 0.044 14.633 0.031 14.578 0.044 5057.75 0.640 14.982 0.034 14.630 0.056 14.515 0.047 5084.69 0.684 15.025 0.043 14.718 0.035 14.625 0.059 5087.73 0.817 14.788 0.036 14.576 0.038 14.510 0.048 5088.80 0.213 15.158 0.063 14.728 0.064 14.762 0.063 5377.80 0.961 15.028 0.077 14.690 0.073 .... .... 5379.84 0.719 14.859 0.034 14.589 0.025 14.521 0.033 5413.85 0.401