Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV5655

J œm H œm Ks œm JD � 2445000 Phase

12.845 0.042 12.383 0.044 12.268 0.063 4963.89 0.290 13.023 0.050 12.526 0.047 12.429 0.044 4966.90 0.502 13.206 0.044 12.714 0.038 12.621 0.038 4997.87 0.682 12.869 0.022 12.589 0.018 12.473 0.020 5001.89 0.964 12.840 0.016 12.505 0.020 12.399 0.024 5002.83 0.031 12.824 0.028 12.433 0.036 12.313 0.037 5004.89 0.175 13.137 0.022 12.628 0.021 12.519 0.029 5053.76 0.614 13.124 0.017 12.719 0.020 12.623 0.021 5055.80 0.758 13.165 0.020 12.758 0.021 12.654 0.022 5056.84 0.831 13.030 0.027 12.672 0.023 12.576 0.035 5057.85 0.902 12.831 0.018 12.458 0.024 12.381 0.031 5060.70 0.102 13.117 0.050 12.628 0.046 12.481 0.058 5081.84 0.590 12.846 0.030 12.479 0.031 12.356 0.038 5088.75 0.076 12.864 0.020 12.428 0.023 12.309 0.023 5120.65 0.321 12.914 0.032 12.444 0.031 12.322 0.042 5121.64 0.390 12.858 0.039 12.405 0.039 12.304 0.039 5376.83 0.347 13.045 0.044 12.572 0.037 12.451 0.037 5379.83 0.558 12.837 0.017 12.450 0.030 12.306 0.030 5388.81 0.191 12.838 0.019 12.413 0.018 12.283 0.022 5389.80 0.260 13.188 0.025 12.762 0.029 12.615 0.033 5410.77 0.736 13.163 0.038 12.726 0.037 12.689 0.033 5412.77 0.876