Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV6065

J œm H œm Ks œm JD � 2445000 Phase

13.791 0.019 13.471 0.016 13.377 0.028 4344.61 0.359 13.878 0.023 13.532 0.016 13.473 0.023 4642.83 0.972 13.763 0.039 13.430 0.041 13.385 0.037 4999.89 0.189 13.764 0.028 13.446 0.034 13.329 0.027 5000.90 0.337 13.805 0.023 13.423 0.025 13.368 0.026 5001.82 0.471 13.901 0.018 13.496 0.020 13.392 0.024 5002.89 0.628 13.938 0.036 13.547 0.037 13.503 0.042 5003.90 0.774 13.947 0.030 13.605 0.040 13.459 0.047 5030.85 0.716 13.969 0.027 13.559 0.031 13.524 0.046 5031.86 0.864 13.756 0.023 13.473 0.021 13.417 0.028 5053.76 0.067 13.907 0.035 13.607 0.028 13.494 0.027 5086.73 0.888 13.721 0.038 13.496 0.030 13.446 0.031 5087.74 0.035 13.811 0.042 .... .... .... .... 5088.74 0.183 14.002 0.044 13.584 0.037 13.514 0.072 5379.82 0.750 13.856 0.025 13.444 0.028 13.356 0.042 5412.77 0.569 13.952 0.025 13.620 0.023 13.483 0.031 5414.85 0.872 13.793 0.030 13.485 0.033 13.420 0.029 5415.83 0.017 13.766 0.033 13.472 0.034 13.360 0.028 5416.84 0.163 13.755 0.033 13.423 0.019 13.341 0.017 5417.84 0.310 13.816 0.015 13.443 0.022 13.397 0.020 5418.84 0.457 13.881 0.022 13.503 0.021 13.406 0.025 5419.84 0.603