Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV6093

J œm H œm Ks œm JD � 2445000 Phase

14.043 0.031 13.762 0.020 13.726 0.048 4344.61 0.008 14.284 0.017 13.897 0.023 13.797 0.032 4642.86 0.340 14.390 0.045 14.020 0.036 13.910 0.044 4997.86 0.535 14.097 0.028 13.876 0.040 13.831 0.031 4998.90 0.752 14.031 0.039 13.795 0.038 13.697 0.036 4999.88 0.957 14.112 0.034 13.778 0.031 13.711 0.039 5000.89 0.168 14.310 0.039 13.915 0.047 13.833 0.050 5030.86 0.432 14.331 0.028 14.009 0.035 13.976 0.044 5031.88 0.644 14.100 0.023 13.807 0.023 13.672 0.032 5053.78 0.222 13.992 0.027 13.745 0.027 13.726 0.027 5056.78 0.849 14.119 0.057 13.785 0.041 13.721 0.050 5081.81 0.080 14.316 0.041 .... .... 13.805 0.025 5083.69 0.473 14.222 0.038 13.975 0.055 13.907 0.040 5084.70 0.683 14.146 0.043 13.818 0.034 13.717 0.038 5087.72 0.315 14.349 0.038 13.956 0.042 13.874 0.043 5088.74 0.528 14.206 0.067 13.837 0.063 13.856 0.082 5379.82 0.363 14.118 0.021 13.831 0.023 13.740 0.029 5412.79 0.253 14.268 0.027 13.973 0.027 13.905 0.029 5414.85 0.684 14.002 0.027 13.767 0.025 13.712 0.028 5415.85 0.892 14.095 0.042 13.755 0.030 13.670 0.043 5416.85 0.102 14.168 0.041 13.759 0.028 13.751 0.020 5417.85 0.311 14.332 0.018 13.989 0.030 13.910 0.024 5418.86 0.521 14.140 0.035 13.899 0.022 13.868 0.031 5419.85 0.730