Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV6098

J œm H œm Ks œm JD � 2445000 Phase

11.650 0.023 11.321 0.020 11.228 0.019 4668.60 0.619 11.834 0.020 11.457 0.017 11.374 0.016 4676.73 0.954 11.709 0.040 11.357 0.041 11.236 0.040 4962.89 0.761 11.795 0.040 11.386 0.040 11.270 0.041 4964.88 0.843 11.796 0.041 11.478 0.034 11.395 0.038 4997.88 0.205 11.630 0.032 11.344 0.029 11.275 0.036 5003.84 0.450 11.644 0.021 11.313 0.026 11.236 0.039 5005.85 0.533 11.691 0.019 11.341 0.028 11.270 0.045 5058.84 0.719 11.913 0.021 11.516 0.017 11.403 0.020 5065.86 0.009 11.755 0.031 11.398 0.025 11.307 0.017 5086.84 0.875 11.806 0.031 11.424 0.027 11.325 0.032 5087.81 0.915 11.642 0.030 11.352 0.031 11.343 0.041 5121.65 0.311 11.643 0.043 11.379 0.050 11.336 0.046 5122.61 0.351 11.647 0.023 11.398 0.021 11.324 0.018 5123.66 0.394 11.879 0.016 11.503 0.020 11.406 0.023 5381.85 0.046 11.884 0.018 11.557 0.017 11.441 0.021 5383.82 0.128 11.855 0.027 11.538 0.053 11.402 0.069 5384.81 0.169 11.744 0.031 11.466 0.023 11.361 0.017 5386.83 0.252 11.663 0.015 11.395 0.016 11.303 0.026 5411.76 0.280