Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV8036

J œm H œm Ks œm JD � 2445000 Phase

11.797 0.036 11.440 0.016 11.342 0.044 4290.83 0.196 11.826 0.019 11.470 0.016 11.299 0.023 4344.63 0.091 12.026 0.025 11.551 0.019 11.435 0.023 4668.61 0.508 12.140 0.050 11.640 0.027 11.470 0.037 4669.83 0.550 12.159 0.023 11.646 0.024 11.548 0.027 4670.74 0.583 12.106 0.019 11.769 0.021 11.652 0.015 4676.74 0.794 11.777 0.041 11.519 0.041 11.407 0.042 4962.90 0.877 11.886 0.040 11.552 0.040 11.441 0.044 4964.89 0.948 11.836 0.040 11.461 0.040 11.355 0.041 4967.87 0.053 11.881 0.032 11.438 0.028 11.320 0.037 5003.85 0.320 11.947 0.021 11.465 0.027 11.343 0.039 5005.85 0.391 11.858 0.019 11.410 0.028 11.328 0.048 5058.73 0.254 11.810 0.039 11.410 0.022 11.276 0.016 5083.77 0.137 11.778 0.032 11.394 0.025 11.270 0.017 5086.85 0.245 11.840 0.031 11.416 0.028 11.292 0.031 5087.81 0.279 12.266 0.024 11.787 0.017 11.646 0.023 5126.66 0.648 11.992 0.052 11.529 0.052 11.426 0.052 5375.89 0.430 12.021 0.026 11.539 0.026 11.403 0.025 5376.84 0.464 12.032 0.023 11.570 0.027 11.455 0.023 5377.82 0.498 12.285 0.017 11.860 0.019 11.696 0.015 5383.82 0.710 12.086 0.021 11.750 0.028 11.637 0.026 5385.83 0.780 12.266 0.017 11.797 0.017 11.677 0.027 5410.78 0.659 12.290 0.022 11.863 0.034 11.738 0.028 5412.78 0.730 11.841 0.026 11.631 0.025 11.557 0.022 5415.84 0.838 12.185 0.019 11.738 0.016 11.576 0.020 5437.57 0.603