Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV872

J œm H œm Ks œm JD � 2445000 Phase

12.168 0.035 11.682 0.028 11.470 0.032 4342.56 0.454 11.984 0.025 11.665 0.025 11.551 0.028 4649.66 0.740 12.127 0.028 11.643 0.026 11.525 0.023 4670.80 0.449 12.204 0.026 11.753 0.029 11.640 0.016 4674.58 0.575 12.274 0.017 11.846 0.016 11.733 0.022 4676.75 0.648 12.109 0.046 11.594 0.026 11.458 0.026 4758.59 0.389 11.941 0.040 11.439 0.041 11.279 0.042 4962.70 0.226 11.992 0.040 11.467 0.040 11.351 0.044 4963.71 0.259 12.023 0.042 11.580 0.040 11.426 0.040 4966.69 0.359 12.168 0.018 11.685 0.024 11.599 0.031 5060.54 0.503 11.931 0.020 11.594 0.028 11.486 0.035 5068.55 0.771 11.982 0.037 11.493 0.020 11.345 0.019 5083.84 0.283 12.040 0.028 11.517 0.051 11.398 0.030 5084.77 0.315 12.042 0.033 11.548 0.016 11.410 0.024 5085.66 0.344 12.053 0.032 11.557 0.024 11.421 0.018 5086.62 0.376 12.144 0.032 11.639 0.028 11.517 0.032 5087.58 0.408 12.133 0.029 11.621 0.031 11.511 0.038 5088.57 0.442 12.039 0.021 11.688 0.017 11.593 0.021 5126.58 0.715 11.864 0.052 11.388 0.052 11.329 0.052 5375.80 0.062 11.843 0.026 11.405 0.025 11.270 0.027 5376.66 0.091 11.853 0.024 11.394 0.025 11.290 0.023 5377.63 0.124 11.870 0.037 11.408 0.023 11.310 0.026 5378.63 0.157 11.933 0.033 11.458 0.023 11.294 0.022 5379.67 0.192 12.185 0.015 11.688 0.018 11.589 0.025 5388.64 0.492