Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV873

J œm H œm Ks œm JD � 2445000 Phase

11.328 0.035 11.025 0.031 10.982 0.076 4284.78 0.746 11.865 0.039 11.404 0.032 11.182 0.038 4342.57 0.429 11.411 0.021 10.964 0.016 10.841 0.016 4639.85 0.084 11.755 0.025 11.315 0.025 11.194 0.026 4649.67 0.369 11.281 0.050 10.940 0.034 10.865 0.039 4666.63 0.863 11.344 0.024 10.932 0.016 10.838 0.019 4668.68 0.923 11.298 0.027 10.912 0.016 10.818 0.016 4669.59 0.949 11.310 0.025 10.909 0.024 10.824 0.017 4670.75 0.983 11.476 0.017 11.036 0.019 10.916 0.019 4676.76 0.158 11.859 0.041 11.420 0.041 11.296 0.040 4962.69 0.483 11.836 0.041 11.443 0.042 11.301 0.041 4963.71 0.512 11.743 0.040 11.379 0.043 11.272 0.044 4964.70 0.541 11.584 0.022 11.119 0.028 11.013 0.045 5058.55 0.273 11.350 0.036 10.956 0.018 10.827 0.016 5083.84 0.010 11.373 0.032 10.934 0.051 10.820 0.031 5084.78 0.037 11.394 0.032 10.960 0.016 10.835 0.023 5085.72 0.065 11.358 0.031 10.941 0.025 10.843 0.017 5086.63 0.091 11.398 0.031 10.961 0.026 10.847 0.030 5087.64 0.120 11.428 0.029 10.989 0.030 10.875 0.038 5088.63 0.149 11.476 0.024 11.041 0.019 10.908 0.034 5090.55 0.205 11.324 0.015 11.012 0.017 10.921 0.017 5351.73 0.809 11.599 0.037 11.291 0.022 11.231 0.030 5378.64 0.592 11.440 0.033 11.216 0.022 11.126 0.023 5379.68 0.623 11.390 0.018 11.161 0.017 11.091 0.021 5380.67 0.652 11.364 0.016 11.131 0.017 11.057 0.022 5381.65 0.680 11.362 0.035 11.123 0.035 11.036 0.037 5382.64 0.709 11.341 0.018 11.086 0.019 10.994 0.016 5383.62 0.738 11.347 0.019 11.041 0.027 10.937 0.024 5385.71 0.798 11.289 0.030 10.994 0.023 10.902 0.017 5386.62 0.825 11.871 0.018 11.418 0.020 11.293 0.029 5409.61 0.494 11.834 0.023 11.443 0.019 11.304 0.032 5411.59 0.552 11.574 0.015 11.131 0.018 11.007 0.022 5437.56 0.308 11.599 0.015 11.132 0.019 11.032 0.019 5438.56 0.337

Table 2—Continued

J œm H œm Ks œm JD � 2445000 Phase