Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV875

J œm H œm Ks œm JD � 2445000 Phase

11.758 0.036 11.417 0.031 11.293 0.075 4284.81 0.159 11.575 0.034 11.259 0.023 11.172 0.041 4292.87 0.425 11.785 0.034 11.392 0.031 11.274 0.038 4342.58 0.062 11.730 0.044 11.407 0.034 11.323 0.034 4407.53 0.202 11.646 0.021 11.261 0.023 11.170 0.016 4639.86 0.856 11.558 0.052 11.225 0.033 11.106 0.045 4666.64 0.738 11.657 0.024 11.256 0.024 11.181 0.025 4670.76 0.874 11.696 0.024 11.388 0.027 11.247 0.019 4674.59 0.000 11.815 0.019 11.412 0.022 11.302 0.017 4676.78 0.072 11.560 0.040 11.247 0.040 11.164 0.042 4962.72 0.492 11.542 0.040 11.241 0.040 11.156 0.042 4963.72 0.525 11.543 0.047 11.242 0.041 11.146 0.042 4995.72 0.579 11.531 0.042 11.186 0.033 11.106 0.038 4997.72 0.645 11.631 0.029 11.250 0.035 11.145 0.037 5032.82 0.802 11.589 0.016 11.206 0.017 11.129 0.035 5059.56 0.682 11.713 0.024 11.298 0.021 11.214 0.033 5067.56 0.946 11.739 0.025 11.418 0.025 11.287 0.027 5376.67 0.129 11.628 0.033 11.341 0.023 11.255 0.022 5379.69 0.229 11.584 0.019 11.310 0.015 11.211 0.027 5380.67 0.261 11.530 0.015 11.270 0.019 11.204 0.025 5381.66 0.294 11.525 0.035 11.297 0.037 11.207 0.037 5382.64 0.326 11.529 0.018 11.287 0.017 11.191 0.019 5383.63 0.358 11.534 0.016 11.268 0.022 11.188 0.020 5384.63 0.391 11.502 0.030 11.215 0.022 11.139 0.016 5386.63 0.457