Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV876

J œm H œm Ks œm JD � 2445000 Phase

12.236 0.034 11.780 0.029 11.642 0.037 4342.59 0.252 11.985 0.026 11.710 0.025 11.653 0.028 4649.69 0.777 12.505 0.057 12.083 0.034 11.949 0.040 4666.67 0.525 12.031 0.028 11.761 0.021 11.707 0.021 4670.77 0.705 11.969 0.028 11.634 0.029 11.539 0.025 4674.61 0.875 11.983 0.028 11.615 0.016 11.500 0.030 4676.79 0.971 12.530 0.056 12.147 0.036 12.033 0.041 4758.60 0.573 12.082 0.040 11.830 0.045 11.740 0.041 4964.71 0.651 12.002 0.042 11.601 0.044 11.504 0.044 4995.73 0.017 12.040 0.042 11.606 0.036 11.496 0.037 4997.73 0.105 12.091 0.041 11.649 0.038 11.550 0.036 4999.70 0.192 12.314 0.033 11.864 0.029 11.749 0.038 5003.65 0.366 12.429 0.025 11.977 0.030 11.903 0.041 5005.67 0.455 12.001 0.033 11.607 0.031 11.489 0.032 5087.64 0.065 12.071 0.021 11.640 0.028 11.551 0.031 5089.55 0.149 12.495 0.026 12.099 0.025 11.970 0.027 5120.54 0.514 12.553 0.032 12.113 0.034 12.035 0.042 5121.53 0.558 11.960 0.040 11.638 0.024 11.539 0.033 5378.65 0.881 11.975 0.037 11.612 0.025 11.506 0.027 5379.69 0.927 11.962 0.020 11.583 0.022 11.473 0.027 5381.67 0.014 11.988 0.039 11.599 0.038 11.487 0.038 5382.65 0.057 12.149 0.036 11.694 0.025 11.580 0.020 5386.64 0.233 12.273 0.022 11.807 0.022 11.686 0.028 5388.64 0.321 12.403 0.038 11.961 0.035 11.847 0.041 5413.68 0.424 12.510 0.036 12.123 0.033 12.004 0.027 5416.61 0.553 12.000 0.021 11.671 0.024 11.584 0.021 5445.75 0.836