Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV877

J œm H œm Ks œm JD � 2445000 Phase

11.541 0.040 11.042 0.026 10.871 0.038 4342.59 0.160 11.398 0.061 10.998 0.048 10.903 0.047 4404.66 0.535 11.352 0.022 10.867 0.016 10.738 0.019 4639.87 0.743 11.596 0.051 11.127 0.032 11.014 0.042 4666.68 0.337 11.568 0.023 11.127 0.017 11.002 0.019 4668.70 0.381 11.540 0.027 11.095 0.023 10.954 0.015 4669.60 0.401 11.485 0.023 11.063 0.023 10.984 0.021 4670.81 0.428 11.323 0.024 10.862 0.037 10.749 0.028 4998.69 0.689 11.328 0.020 10.840 0.033 10.711 0.033 5004.68 0.821 11.455 0.017 11.049 0.025 10.970 0.031 5034.61 0.484 11.436 0.022 10.922 0.029 10.815 0.050 5058.56 0.014 11.472 0.020 10.952 0.027 10.800 0.025 5061.55 0.080 11.601 0.020 11.083 0.025 10.951 0.032 5068.55 0.235 11.331 0.031 10.885 0.026 10.770 0.030 5087.65 0.658 11.432 0.027 10.913 0.027 10.766 0.025 5376.68 0.058 11.516 0.021 10.984 0.016 10.860 0.020 5380.68 0.147 11.519 0.037 .... .... .... .... 5382.66 0.191 11.550 0.019 11.031 0.015 10.894 0.017 5383.63 0.212 11.594 0.031 11.106 0.022 10.954 0.016 5386.65 0.279 11.591 0.020 11.124 0.016 10.986 0.021 5387.61 0.300 11.346 0.018 10.851 0.022 10.721 0.025 5409.62 0.788 11.374 0.023 10.855 0.022 10.723 0.024 5414.66 0.899 11.382 0.034 10.882 0.034 10.739 0.023 5416.57 0.942