Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV878

J œm H œm Ks œm JD � 2445000 Phase

12.463 0.049 12.065 0.030 11.953 0.037 4342.60 0.411 12.157 0.020 11.712 0.018 11.578 0.021 4639.87 0.171 12.327 0.050 11.896 0.032 11.786 0.044 4666.69 0.322 12.414 0.026 12.030 0.025 11.956 0.027 4670.78 0.498 11.949 0.025 11.705 0.030 11.616 0.022 4674.61 0.662 12.045 0.041 11.602 0.040 11.530 0.052 4962.73 0.030 12.050 0.041 11.632 0.040 11.520 0.043 4963.74 0.073 12.150 0.041 11.894 0.034 11.817 0.037 4997.74 0.533 11.975 0.039 11.754 0.038 11.677 0.038 4999.72 0.618 11.921 0.032 11.601 0.028 11.502 0.037 5003.67 0.787 11.916 0.022 11.562 0.026 11.456 0.039 5005.68 0.874 11.932 0.028 11.528 0.033 11.447 0.043 5030.67 0.946 12.084 0.019 11.644 0.026 11.509 0.032 5034.64 0.117 12.205 0.019 11.769 0.025 11.663 0.028 5060.55 0.229 12.022 0.020 11.833 0.025 11.768 0.032 5068.56 0.573 12.206 0.038 11.770 0.019 11.647 0.023 5083.85 0.229 12.335 0.033 11.880 0.016 11.770 0.025 5085.73 0.310 12.357 0.042 11.909 0.035 .... .... 5086.63 0.349 12.439 0.032 12.030 0.030 11.876 0.033 5087.59 0.390 12.446 0.029 12.051 0.032 11.930 0.038 5088.57 0.432 12.460 0.019 12.101 0.026 11.974 0.028 5089.55 0.474 12.003 0.018 11.599 0.020 11.460 0.025 5124.60 0.979 11.940 0.019 11.663 0.018 11.565 0.019 5351.74 0.729 11.967 0.052 11.616 0.052 11.571 0.052 5375.80 0.762 11.916 0.024 11.569 0.027 11.479 0.024 5377.64 0.841 11.955 0.033 11.567 0.023 11.488 0.023 5379.70 0.929 11.952 0.019 11.566 0.015 11.454 0.020 5380.69 0.971 11.965 0.015 11.563 0.017 11.452 0.023 5381.68 0.014 12.107 0.016 11.663 0.015 11.561 0.020 5384.63 0.141