Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV879

J œm H œm Ks œm JD � 2445000 Phase

11.426 0.030 11.045 0.023 10.933 0.045 4290.80 0.655 11.680 0.033 11.181 0.026 11.032 0.036 4342.60 0.063 11.438 0.057 11.003 0.042 10.876 0.041 4405.55 0.775 11.547 0.046 11.246 0.047 11.147 0.047 4650.72 0.440 11.495 0.052 10.998 0.032 10.898 0.040 4666.69 0.874 11.511 0.025 11.037 0.016 10.890 0.016 4668.71 0.929 11.555 0.026 11.069 0.020 10.885 0.020 4669.61 0.954 11.575 0.024 11.074 0.021 10.940 0.019 4670.82 0.987 11.657 0.027 11.184 0.030 11.047 0.015 4674.62 0.090 11.480 0.017 11.109 0.017 11.039 0.034 5059.57 0.556 11.433 0.018 11.043 0.032 10.937 0.026 5061.56 0.610 11.423 0.016 10.999 0.015 10.882 0.021 5065.56 0.718 11.837 0.037 11.350 0.020 11.190 0.021 5083.86 0.216 11.915 0.035 11.370 0.052 11.230 0.031 5084.79 0.241 11.940 0.032 11.421 0.017 11.290 0.023 5085.73 0.267 11.983 0.045 11.416 0.026 11.300 0.017 5086.63 0.291 11.968 0.031 11.496 0.026 11.330 0.031 5087.60 0.318 11.927 0.030 11.475 0.032 11.351 0.039 5088.58 0.344 11.819 0.017 11.419 0.026 11.311 0.028 5089.56 0.371 11.657 0.023 11.364 0.024 11.235 0.036 5090.56 0.398 11.590 0.020 11.287 0.019 11.155 0.024 5091.57 0.425 11.507 0.020 11.226 0.025 11.137 0.035 5092.56 0.453 11.951 0.044 11.462 0.051 11.310 0.047 5122.66 0.271 11.495 0.019 11.201 0.019 11.068 0.023 5351.75 0.499 11.490 0.017 11.152 0.015 11.068 0.017 5389.64 0.529 11.596 0.016 11.118 0.024 10.982 0.017 5408.61 0.045 11.704 0.029 11.212 0.025 11.056 0.040 5411.60 0.126 11.807 0.022 11.297 0.023 11.138 0.023 5413.69 0.183