Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV881

J œm H œm Ks œm JD � 2445000 Phase

11.371 0.035 10.977 0.026 10.870 0.036 4342.62 0.437 11.414 0.057 11.076 0.044 10.977 0.045 4406.60 0.226 11.640 0.020 11.169 0.015 11.076 0.015 4639.88 0.749 11.565 0.048 11.274 0.048 11.186 0.048 4650.73 0.053 11.413 0.051 10.983 0.031 10.864 0.041 4666.70 0.500 11.410 0.022 10.999 0.016 10.864 0.022 4668.72 0.556 11.460 0.029 11.029 0.016 10.904 0.021 4669.62 0.581 11.488 0.023 11.055 0.022 10.929 0.016 4670.83 0.615 11.632 0.026 11.168 0.029 11.048 0.019 4674.68 0.723 11.804 0.044 11.307 0.044 11.201 0.044 4963.73 0.806 11.918 0.040 11.502 0.042 11.349 0.047 4967.68 0.916 11.785 0.025 11.418 0.029 11.314 0.040 5005.69 0.979 11.432 0.038 11.140 0.020 11.046 0.020 5083.86 0.165 11.417 0.034 11.072 0.053 11.018 0.035 5084.79 0.191 11.376 0.034 11.047 0.028 10.935 0.032 5087.61 0.270 11.361 0.032 11.005 0.033 10.912 0.040 5088.59 0.297 11.339 0.021 10.975 0.028 10.888 0.029 5089.57 0.325 11.341 0.027 10.985 0.023 10.869 0.037 5090.57 0.352 11.355 0.024 10.962 0.029 10.852 0.036 5092.57 0.409 11.372 0.027 10.966 0.029 10.874 0.027 5377.65 0.380 11.448 0.019 11.010 0.019 10.890 0.024 5383.64 0.548 11.526 0.024 11.107 0.020 10.997 0.028 5387.61 0.659 11.589 0.019 11.134 0.023 11.023 0.025 5388.65 0.688 11.534 0.019 11.289 0.019 11.200 0.024 5436.61 0.029