Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV882

J œm H œm Ks œm JD � 2445000 Phase

11.829 0.036 11.378 0.030 11.236 0.033 4342.64 0.491 11.841 0.062 11.402 0.044 11.274 0.046 4406.63 0.502 11.636 0.021 11.387 0.015 11.293 0.019 4639.89 0.833 11.617 0.047 11.196 0.046 11.025 0.047 4650.74 0.174 12.006 0.044 11.640 0.021 11.491 0.035 4666.71 0.676 11.944 0.030 11.570 0.023 11.462 0.026 4668.72 0.740 11.795 0.026 11.489 0.021 11.378 0.020 4669.62 0.768 .... .... 11.397 0.033 11.328 0.031 4670.53 0.796 11.606 0.037 11.275 0.040 11.175 0.027 4674.68 0.927 11.580 0.041 11.220 0.043 11.175 0.055 4963.75 0.012 11.591 0.040 11.220 0.040 11.047 0.042 4965.69 0.073 11.598 0.041 11.220 0.040 11.053 0.042 4994.81 0.988 11.633 0.032 11.185 0.029 11.047 0.037 5003.68 0.267 11.667 0.022 11.211 0.026 11.076 0.038 5005.70 0.331 11.647 0.032 11.365 0.016 11.272 0.023 5085.74 0.846 11.585 0.032 11.295 0.027 11.191 0.030 5087.66 0.907 11.603 0.020 11.187 0.016 11.052 0.022 5126.59 0.131 11.562 0.018 11.174 0.015 11.038 0.021 5380.70 0.117 11.588 0.017 11.171 0.017 11.037 0.016 5383.65 0.210 11.645 0.030 11.210 0.023 11.065 0.016 5386.65 0.304 11.729 0.021 11.254 0.019 11.123 0.024 5388.66 0.367 11.749 0.015 11.293 0.016 11.165 0.020 5389.65 0.398 11.561 0.026 11.203 0.028 11.124 0.040 5409.63 0.027 11.589 0.022 11.165 0.023 11.027 0.024 5414.66 0.185