Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV883

J œm H œm Ks œm JD � 2445000 Phase

10.330 0.021 9.878 0.024 9.696 0.028 4293.88 0.068 10.162 0.039 9.797 0.024 9.610 0.017 4640.84 0.659 10.069 0.046 9.674 0.046 9.472 0.047 4650.75 0.733 10.005 0.040 9.656 0.021 .... .... 4666.61 0.851 10.092 0.027 9.678 0.016 9.491 0.017 4669.63 0.874 10.145 0.025 9.717 0.027 9.533 0.017 4674.69 0.912 10.662 0.033 10.290 0.039 10.124 0.040 4992.71 0.287 10.555 0.032 10.201 0.028 10.054 0.036 5003.68 0.369 10.189 0.039 9.853 0.043 9.716 0.046 5032.57 0.585 10.213 0.031 9.763 0.027 9.601 0.030 5087.62 0.996 10.265 0.028 9.855 0.036 9.656 0.035 5089.58 0.010 10.695 0.031 10.255 0.030 10.107 0.040 5121.54 0.249 10.653 0.052 10.186 0.052 9.987 0.052 5375.90 0.149 10.611 0.024 10.184 0.027 10.005 0.023 5377.66 0.162 10.691 0.016 10.276 0.016 10.096 0.018 5384.64 0.214 10.710 0.017 10.308 0.016 10.144 0.018 5389.65 0.251 10.553 0.016 10.219 0.016 10.095 0.017 5408.61 0.393 10.352 0.026 10.066 0.026 9.943 0.022 5415.61 0.445