Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV885

J œm H œm Ks œm JD � 2445000 Phase

12.011 0.040 11.614 0.029 11.439 0.032 4342.67 0.759 12.078 0.028 11.591 0.018 11.455 0.017 4640.86 0.161 12.030 0.046 11.635 0.046 11.501 0.046 4650.76 0.640 12.288 0.067 11.735 0.040 11.587 0.043 4666.72 0.411 12.036 0.033 11.644 0.023 11.573 0.015 4670.79 0.607 12.011 0.025 11.607 0.033 11.522 0.017 4674.70 0.796 .... .... 11.570 0.048 11.448 0.044 4965.69 0.852 12.025 0.041 11.585 0.042 11.449 0.043 4967.69 0.948 12.265 0.040 11.755 0.036 11.633 0.034 4999.72 0.495 12.021 0.027 11.537 0.027 11.408 0.038 5031.65 0.037 11.994 0.028 11.544 0.034 11.387 0.038 5032.58 0.082 12.190 0.019 11.670 0.031 11.534 0.046 5058.57 0.338 12.284 0.019 11.738 0.025 11.635 0.024 5060.79 0.445 11.983 0.021 11.620 0.022 11.481 0.021 5066.55 0.723 12.199 0.037 11.742 0.019 11.613 0.016 5083.86 0.559 11.974 0.031 11.604 0.026 11.484 0.034 5087.66 0.743 11.960 0.024 11.542 0.019 11.397 0.038 5090.57 0.883 11.999 0.052 11.657 0.052 11.542 0.052 5375.80 0.660 11.972 0.026 11.611 0.026 11.484 0.026 5376.68 0.703 12.079 0.019 11.576 0.029 11.441 0.022 5385.72 0.139 12.074 0.030 11.581 0.023 11.437 0.019 5386.66 0.185 12.088 0.018 11.616 0.016 11.488 0.022 5387.62 0.231 12.152 0.015 11.638 0.019 11.503 0.025 5388.67 0.282 12.187 0.015 11.665 0.016 11.526 0.017 5389.66 0.330 12.226 0.016 11.694 0.017 11.575 0.029 5411.60 0.390 12.007 0.019 11.541 0.023 11.410 0.017 5444.57 0.982