Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV886

J œm H œm Ks œm JD � 2445000 Phase

11.943 0.033 11.484 0.031 11.389 0.039 4342.68 0.149 11.754 0.054 11.406 0.043 11.319 0.044 4407.55 0.855 11.801 0.051 11.574 0.038 11.471 0.038 4666.73 0.666 11.785 0.026 11.471 0.027 11.349 0.021 4668.73 0.750 11.776 0.025 11.388 0.028 11.308 0.023 4674.71 0.999 11.973 0.040 11.542 0.040 11.416 0.045 4967.70 0.221 12.015 0.034 11.575 0.040 11.458 0.042 4992.72 0.264 12.113 0.042 11.681 0.041 11.518 0.044 4994.83 0.352 12.238 0.025 11.849 0.038 11.766 0.028 4998.71 0.514 11.703 0.028 11.353 0.033 11.242 0.036 5032.59 0.927 11.770 0.018 11.370 0.029 11.277 0.044 5058.57 0.011 11.827 0.017 11.394 0.024 11.315 0.027 5060.56 0.094 12.142 0.017 11.689 0.024 11.608 0.034 5067.57 0.387 12.172 0.021 11.755 0.028 11.662 0.035 5092.58 0.430 11.828 0.019 11.631 0.020 11.553 0.024 5120.58 0.598 11.813 0.020 11.611 0.020 11.558 0.022 5120.59 0.598 11.804 0.031 11.580 0.031 11.506 0.041 5121.55 0.638 12.071 0.024 11.649 0.027 11.539 0.024 5377.66 0.322 12.218 0.015 11.849 0.016 11.717 0.023 5381.68 0.489 12.016 0.017 11.742 0.017 11.636 0.015 5383.65 0.572 11.750 0.020 11.493 0.016 11.411 0.021 5387.64 0.738 11.743 0.015 11.432 0.015 11.334 0.017 5389.67 0.822 11.783 0.017 11.543 0.020 11.429 0.026 5410.60 0.695 11.716 0.026 11.352 0.026 11.286 0.022 5415.75 0.910