Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV887

J œm H œm Ks œm JD � 2445000 Phase

12.519 0.037 12.311 0.037 12.178 0.055 4342.69 0.740 12.773 0.046 12.315 0.035 12.180 0.039 4408.59 0.289 12.577 0.047 12.218 0.047 12.118 0.047 4650.77 0.005 12.853 0.025 12.449 0.031 12.427 0.024 4674.72 0.658 12.873 0.018 12.416 0.023 12.320 0.022 4757.61 0.379 12.842 0.042 12.514 0.040 12.414 0.046 4963.75 0.607 12.526 0.040 12.249 0.043 12.214 0.044 4966.70 0.811 12.564 0.041 12.279 0.044 12.188 0.044 4967.71 0.880 12.532 0.044 12.192 0.035 12.100 0.040 4997.79 0.957 12.567 0.043 12.186 0.039 12.094 0.035 4999.75 0.092 12.873 0.025 12.467 0.038 12.328 0.034 5004.69 0.433 12.697 0.032 12.256 0.030 12.141 0.042 5030.67 0.226 12.852 0.018 12.497 0.031 12.388 0.040 5034.67 0.502 12.644 0.019 12.207 0.030 12.174 0.049 5058.58 0.153 12.850 0.019 12.428 0.032 12.288 0.031 5061.60 0.361 12.634 0.020 12.375 0.022 12.290 0.024 5066.57 0.704 12.479 0.017 12.236 0.023 12.171 0.033 5067.73 0.784 12.864 0.045 12.480 0.051 12.411 0.048 5122.55 0.568 12.564 0.052 12.195 0.052 12.117 0.052 5375.80 0.048 12.721 0.042 12.292 0.024 12.210 0.026 5378.66 0.245 12.758 0.047 12.283 0.037 12.209 0.040 5378.86 0.259 12.897 0.019 12.498 0.027 12.406 0.022 5381.69 0.454 12.797 0.017 12.501 0.021 12.380 0.029 5384.65 0.658 12.532 0.018 12.244 0.017 12.204 0.028 5387.65 0.866 12.572 0.015 12.210 0.016 12.156 0.030 5389.68 0.006 12.897 0.022 12.442 0.030 12.355 0.040 5409.64 0.384 12.900 0.021 12.531 0.021 12.412 0.037 5411.63 0.521 12.528 0.022 12.274 0.023 12.238 0.025 5414.72 0.734