Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV889

J œm H œm Ks œm JD � 2445000 Phase

12.085 0.038 11.612 0.050 11.481 0.032 4342.69 0.313 11.937 0.044 11.607 0.034 11.526 0.035 4407.59 0.828 11.931 0.055 11.570 0.036 11.467 0.037 4666.74 0.872 11.900 0.023 11.590 0.019 11.416 0.016 4668.74 0.950 11.849 0.029 11.488 0.024 11.400 0.018 4670.55 0.020 11.937 0.042 11.487 0.018 11.381 0.023 4675.57 0.215 12.121 0.041 11.677 0.040 11.525 0.040 4964.72 0.421 12.253 0.041 11.773 0.042 11.666 0.049 4966.71 0.499 12.025 0.042 11.732 0.034 11.642 0.037 4997.76 0.702 11.959 0.039 11.655 0.039 11.563 0.035 4999.75 0.779 11.879 0.020 11.435 0.027 11.339 0.029 5033.61 0.091 11.906 0.017 11.456 0.025 11.355 0.030 5034.64 0.131 11.948 0.018 11.467 0.031 11.342 0.026 5061.58 0.175 11.916 0.031 11.493 0.026 11.362 0.021 5086.88 0.156 11.988 0.029 11.499 0.030 11.377 0.037 5088.63 0.224 12.113 0.019 11.621 0.025 11.495 0.037 5092.59 0.377 12.215 0.021 11.766 0.021 11.636 0.024 5120.60 0.463 12.280 0.044 11.810 0.050 11.696 0.046 5122.56 0.539 12.295 0.024 11.856 0.025 11.721 0.019 5123.54 0.577 12.324 0.017 11.896 0.019 11.794 0.031 5124.61 0.618 12.200 0.017 11.843 0.021 11.756 0.026 5125.55 0.655 12.152 0.026 11.659 0.027 11.543 0.027 5376.69 0.388 12.223 0.038 11.748 0.023 11.630 0.027 5378.67 0.465 12.263 0.022 11.818 0.021 11.716 0.022 5380.71 0.544 12.020 0.021 11.711 0.030 11.623 0.021 5385.73 0.739 11.894 0.033 11.516 0.031 11.409 0.022 5416.58 0.934