Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV891

J œm H œm Ks œm JD � 2445000 Phase

12.370 0.042 11.970 0.043 11.809 0.044 4994.84 0.445 12.623 0.039 12.175 0.038 12.077 0.041 4999.77 0.732 12.727 0.033 12.352 0.030 12.282 0.041 5003.70 0.960 12.360 0.022 12.145 0.027 12.085 0.039 5005.70 0.077 12.449 0.028 12.017 0.028 11.904 0.038 5031.65 0.585 12.382 0.020 12.113 0.028 12.077 0.051 5058.60 0.152 12.371 0.016 12.086 0.016 12.021 0.036 5059.58 0.210 12.329 0.017 12.003 0.025 11.959 0.025 5060.57 0.267 12.658 0.033 12.221 0.025 12.191 0.019 5086.64 0.783 12.659 0.032 12.243 0.026 12.148 0.032 5087.66 0.842 12.704 0.032 12.290 0.026 12.186 0.040 5087.70 0.845 12.710 0.030 12.329 0.034 12.234 0.039 5088.59 0.897 12.720 0.024 12.358 0.019 12.282 0.038 5090.58 0.012 12.764 0.018 12.404 0.018 12.339 0.028 5124.59 0.990 12.508 0.025 12.057 0.025 11.971 0.028 5376.70 0.650 12.671 0.038 12.195 0.022 12.082 0.028 5378.67 0.765 12.729 0.047 12.234 0.037 12.140 0.040 5378.86 0.775 12.342 0.015 11.984 0.018 11.905 0.025 5388.68 0.346 12.348 0.015 11.979 0.017 11.888 0.018 5389.69 0.405 12.374 0.019 11.959 0.016 11.883 0.019 5408.62 0.506 12.596 0.016 12.115 0.016 11.986 0.026 5411.64 0.681