Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV892

J œm H œm Ks œm JD � 2445000 Phase

12.796 0.036 12.319 0.029 .... .... 4342.72 0.632 12.545 0.026 12.161 0.021 12.082 0.024 4640.88 0.281 13.035 0.046 12.666 0.047 12.610 0.046 4650.83 0.903 12.923 0.033 12.586 0.036 12.564 0.035 4651.65 0.955 12.764 0.020 12.302 0.023 12.218 0.024 4757.64 0.584 12.602 0.044 12.207 0.044 12.105 0.044 4962.74 0.413 12.936 0.045 12.489 0.044 12.350 0.044 4967.72 0.724 12.576 0.023 12.364 0.037 12.290 0.038 5004.70 0.038 12.663 0.038 12.259 0.048 12.144 0.041 5027.65 0.473 12.931 0.032 12.512 0.039 12.373 0.041 5032.59 0.782 12.961 0.023 12.584 0.030 12.466 0.038 5033.62 0.846 12.567 0.021 12.278 0.022 12.202 0.021 5054.72 0.166 12.568 0.021 12.234 0.019 12.136 0.021 5055.74 0.230 12.672 0.022 12.248 0.028 12.127 0.045 5060.58 0.533 12.991 0.021 12.601 0.022 12.486 0.025 5065.57 0.845 12.632 0.036 12.332 0.020 12.265 0.028 5085.75 0.107 12.531 0.024 12.168 0.029 12.074 0.031 5089.60 0.348 12.538 0.052 12.173 0.052 12.143 0.052 5375.81 0.250 12.561 0.027 12.206 0.029 12.102 0.033 5376.71 0.306 12.671 0.036 12.244 0.028 12.127 0.025 5379.71 0.494 12.637 0.022 12.426 0.026 12.369 0.032 5387.66 0.991 12.610 0.020 12.208 0.027 12.084 0.030 5410.61 0.426 12.881 0.026 12.414 0.026 12.304 0.028 5414.73 0.685 12.945 0.030 12.473 0.030 12.385 0.027 5415.76 0.749