Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV893

J œm H œm Ks œm JD � 2445000 Phase

12.567 0.045 12.098 0.041 11.954 0.039 4342.73 0.696 12.128 0.024 11.720 0.023 11.598 0.022 4651.67 0.329 12.168 0.041 11.813 0.028 11.769 0.028 4666.77 0.044 12.129 0.024 11.713 0.023 11.593 0.024 4670.77 0.234 12.167 0.018 11.716 0.015 11.635 0.021 4757.65 0.349 12.344 0.020 11.879 0.021 11.788 0.018 4761.59 0.535 12.543 0.025 12.086 0.038 11.988 0.030 4998.71 0.767 12.212 0.019 11.734 0.026 11.620 0.029 5033.62 0.420 12.451 0.023 11.936 0.030 11.838 0.044 5058.62 0.604 12.496 0.015 11.998 0.019 11.895 0.037 5059.59 0.650 12.304 0.016 11.986 0.018 11.875 0.025 5065.58 0.934 12.186 0.020 11.894 0.021 11.805 0.024 5066.58 0.981 12.622 0.029 12.163 0.053 12.077 0.030 5084.79 0.844 12.474 0.033 12.100 0.017 12.007 0.022 5085.75 0.889 12.148 0.035 11.840 0.042 11.716 0.039 5088.64 0.026 12.100 0.024 11.739 0.021 11.671 0.037 5090.60 0.119 12.085 0.020 11.692 0.025 11.581 0.036 5092.60 0.214 12.303 0.016 11.819 0.017 11.700 0.017 5351.76 0.489 12.508 0.025 12.040 0.026 11.889 0.029 5376.76 0.673 12.548 0.037 12.112 0.022 11.991 0.026 5378.74 0.767 12.592 0.024 12.185 0.015 12.076 0.022 5380.71 0.860 12.110 0.032 11.759 0.022 11.624 0.017 5386.67 0.143 12.140 0.016 11.713 0.015 11.613 0.020 5389.69 0.286 12.128 0.016 11.728 0.017 11.626 0.018 5408.63 0.183 12.185 0.022 11.736 0.024 11.604 0.023 5412.61 0.371 12.368 0.034 11.910 0.030 11.763 0.023 5416.76 0.568