Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV899

J œm H œm Ks œm JD � 2445000 Phase

11.856 0.045 11.391 0.025 11.245 0.034 4342.74 0.983 12.089 0.045 11.597 0.034 11.491 0.033 4408.56 0.105 11.669 0.052 11.381 0.038 11.248 0.041 4666.78 0.429 11.641 0.026 11.305 0.016 11.164 0.019 4668.75 0.492 11.615 0.029 11.212 0.023 11.133 0.027 4670.56 0.551 11.595 0.040 11.161 0.022 11.059 0.019 4675.58 0.713 11.910 0.040 11.436 0.041 11.308 0.042 4964.72 0.033 12.068 0.038 11.608 0.038 11.502 0.036 4999.79 0.163 11.951 0.032 11.629 0.028 11.525 0.040 5003.74 0.290 11.704 0.022 11.427 0.026 11.359 0.038 5005.72 0.354 12.111 0.029 11.678 0.033 11.523 0.039 5032.60 0.221 12.004 0.017 11.513 0.018 11.407 0.036 5059.60 0.091 11.693 0.020 11.441 0.025 11.353 0.032 5068.57 0.380 11.614 0.041 11.124 0.041 11.075 0.043 5081.73 0.804 11.719 0.036 11.273 0.018 11.146 0.018 5083.87 0.873 11.766 0.027 11.257 0.052 11.140 0.030 5084.80 0.903 11.792 0.033 11.309 0.016 11.186 0.023 5085.76 0.934 11.818 0.032 11.352 0.028 11.225 0.031 5087.66 0.995 11.871 0.030 11.406 0.034 11.281 0.038 5088.60 0.026 11.864 0.026 11.571 0.027 11.472 0.026 5376.77 0.314 11.639 0.015 11.328 0.019 11.219 0.022 5381.70 0.473 11.606 0.019 11.225 0.027 11.120 0.021 5385.73 0.603 11.579 0.018 11.186 0.015 11.070 0.025 5387.67 0.666 11.632 0.016 11.194 0.015 11.089 0.019 5389.70 0.731