Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV900

J œm H œm Ks œm JD � 2445000 Phase

11.098 0.023 10.719 0.024 10.622 0.032 4289.83 0.236 10.986 0.034 10.641 0.032 10.467 0.036 4342.74 0.349 11.139 0.054 10.690 0.044 10.571 0.040 4405.57 0.671 11.102 0.043 10.776 0.021 10.687 0.028 4666.79 0.165 11.071 0.023 10.727 0.016 10.637 0.021 4668.80 0.208 11.001 0.025 10.674 0.026 10.585 0.019 4670.57 0.245 10.956 0.038 10.597 0.016 10.491 0.017 4675.59 0.351 11.011 0.046 10.600 0.041 10.489 0.041 4963.77 0.412 11.030 0.040 10.611 0.040 10.493 0.040 4966.72 0.475 11.272 0.032 10.943 0.040 10.841 0.040 4992.73 0.022 11.183 0.042 10.870 0.042 10.762 0.042 4995.74 0.085 11.298 0.031 10.818 0.036 10.669 0.043 5027.66 0.756 11.403 0.032 10.888 0.034 10.705 0.042 5030.71 0.821 11.404 0.032 10.915 0.038 10.810 0.041 5033.63 0.882 11.050 0.018 10.624 0.021 10.500 0.032 5067.58 0.596 11.441 0.038 10.994 0.020 10.853 0.021 5083.87 0.939 11.412 0.034 10.997 0.020 10.892 0.025 5085.76 0.979 11.336 0.037 10.980 0.030 10.882 0.036 5086.64 0.997 11.222 0.031 10.913 0.032 10.807 0.039 5088.64 0.039 11.173 0.019 10.889 0.030 10.804 0.028 5089.61 0.060 11.107 0.039 10.793 0.023 10.691 0.028 5378.74 0.141 11.022 0.023 10.654 0.029 10.546 0.023 5385.74 0.289 10.989 0.022 10.632 0.019 10.512 0.023 5387.67 0.329 11.435 0.027 10.922 0.027 10.799 0.026 5412.63 0.854 11.082 0.023 10.620 0.023 10.501 0.019 5445.76 0.551 11.085 0.018 10.622 0.025 10.492 0.019 5446.68 0.570