Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV901

J œm H œm Ks œm JD � 2445000 Phase

12.677 0.038 12.179 0.029 12.029 0.031 4342.75 0.177 12.496 0.025 12.090 0.025 12.002 0.023 4651.69 0.908 12.682 0.039 12.215 0.020 12.076 0.031 4675.60 0.203 12.562 0.047 12.224 0.027 12.148 0.028 4758.63 0.699 12.493 0.017 12.078 0.017 12.015 0.023 4761.60 0.860 12.510 0.042 12.113 0.041 12.014 0.048 4963.77 0.808 12.522 0.044 12.074 0.047 11.961 0.040 4967.73 0.023 12.870 0.034 12.410 0.040 12.306 0.040 4992.74 0.377 12.896 0.046 12.454 0.044 12.356 0.043 4994.84 0.491 12.502 0.033 12.041 0.033 11.956 0.037 5003.74 0.973 12.530 0.023 12.070 0.029 11.940 0.042 5005.72 0.080 12.808 0.026 12.262 0.040 12.177 0.040 5027.67 0.269 12.887 0.037 12.462 0.056 12.402 0.044 5032.61 0.536 12.671 0.021 12.349 0.024 12.270 0.032 5033.64 0.592 12.556 0.019 12.241 0.016 12.151 0.025 5053.72 0.679 12.513 0.019 12.200 0.021 12.076 0.017 5054.72 0.734 12.843 0.024 12.336 0.021 12.209 0.025 5065.59 0.322 12.824 0.021 12.408 0.025 12.283 0.035 5067.59 0.430 12.926 0.033 12.495 0.028 12.395 0.036 5087.66 0.518 12.641 0.024 12.329 0.019 12.237 0.026 5126.57 0.625 12.614 0.052 12.125 0.052 11.992 0.052 5375.81 0.122 12.654 0.030 12.144 0.030 12.035 0.031 5376.78 0.174 12.875 0.026 12.427 0.020 12.285 0.026 5380.74 0.389 12.481 0.018 12.142 0.017 12.027 0.026 5387.68 0.765 12.625 0.022 12.115 0.026 12.021 0.023 5412.63 0.116