Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV902

J œm H œm Ks œm JD � 2445000 Phase

11.738 0.027 11.531 0.024 11.474 0.043 4292.84 0.860 12.165 0.035 11.771 0.029 11.625 0.041 4342.75 0.754 11.688 0.026 11.379 0.016 11.296 0.016 4640.88 0.064 11.893 0.023 11.455 0.024 11.364 0.023 4651.72 0.476 11.708 0.041 11.409 0.023 11.324 0.032 4666.79 0.047 11.741 0.024 11.356 0.017 11.275 0.020 4668.79 0.123 11.632 0.025 11.281 0.020 11.239 0.022 4670.57 0.191 11.828 0.045 11.393 0.022 11.280 0.050 4675.62 0.382 11.760 0.041 11.354 0.040 11.272 0.044 4964.73 0.350 11.839 0.041 11.408 0.040 11.314 0.044 4966.73 0.426 12.035 0.044 11.579 0.033 11.470 0.036 4997.76 0.604 12.115 0.039 11.706 0.039 11.594 0.035 4999.80 0.681 11.667 0.029 11.452 0.033 11.384 0.037 5032.62 0.926 11.701 0.017 11.403 0.025 11.308 0.030 5034.63 0.002 11.696 0.018 11.317 0.022 11.213 0.033 5067.74 0.258 12.070 0.041 11.776 0.044 11.678 0.047 5081.88 0.795 11.652 0.032 11.419 0.026 11.356 0.017 5086.65 0.976 11.659 0.032 11.394 0.028 11.326 0.031 5087.69 0.015 11.924 0.021 11.473 0.019 11.364 0.024 5126.60 0.492 11.677 0.034 11.360 0.021 11.255 0.022 5379.72 0.094 11.702 0.018 11.316 0.021 11.204 0.023 5409.68 0.231 11.781 0.020 11.338 0.016 11.238 0.030 5411.64 0.305