Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV904

J œm H œm Ks œm JD � 2445000 Phase

12.220 0.034 11.787 0.037 11.608 0.031 4342.76 0.900 11.755 0.053 11.312 0.032 11.152 0.039 4666.80 0.563 11.937 0.032 11.446 0.022 11.342 0.017 4670.80 0.694 12.171 0.039 11.698 0.018 11.590 0.023 4675.60 0.852 11.826 0.047 11.335 0.025 11.211 0.025 4758.65 0.585 11.599 0.044 11.227 0.042 11.124 0.044 4962.75 0.301 11.611 0.041 11.195 0.041 11.078 0.042 4964.74 0.366 11.630 0.042 11.209 0.041 11.092 0.041 4966.74 0.432 11.668 0.025 11.207 0.038 11.108 0.031 4998.73 0.485 11.855 0.022 11.396 0.027 11.257 0.030 5033.84 0.640 11.990 0.022 11.517 0.026 11.402 0.039 5067.60 0.751 11.598 0.043 11.236 0.041 11.163 0.042 5081.88 0.221 11.624 0.033 11.179 0.026 11.083 0.032 5087.67 0.411 11.659 0.018 11.221 0.026 11.082 0.028 5089.62 0.476 11.708 0.021 11.405 0.023 11.319 0.024 5351.77 0.102 12.103 0.027 11.714 0.027 11.614 0.029 5377.67 0.954 11.956 0.038 11.634 0.025 11.542 0.028 5378.75 0.990 11.787 0.023 11.492 0.020 11.390 0.024 5380.75 0.055 11.730 0.020 11.431 0.019 11.344 0.023 5381.71 0.087 11.659 0.021 11.310 0.019 11.237 0.023 5383.66 0.151 11.646 0.020 11.310 0.019 11.200 0.022 5384.65 0.184 11.634 0.039 11.250 0.025 11.140 0.021 5386.68 0.251 11.856 0.021 11.571 0.024 11.481 0.038 5409.69 0.008