Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV909

J œm H œm Ks œm JD � 2445000 Phase

11.689 0.022 11.227 0.025 11.170 0.026 4289.85 0.158 11.202 0.034 10.878 0.031 10.735 0.035 4342.77 0.567 11.596 0.057 11.266 0.044 11.147 0.048 4405.58 0.238 11.253 0.025 10.874 0.021 10.740 0.022 4651.72 0.789 11.623 0.050 11.240 0.031 11.140 0.044 4666.81 0.190 11.580 0.024 11.214 0.016 11.127 0.023 4668.80 0.243 11.337 0.028 11.095 0.022 11.052 0.017 4670.58 0.290 11.264 0.040 11.012 0.021 10.906 0.019 4675.62 0.424 11.533 0.040 11.104 0.040 10.993 0.043 4962.76 0.066 11.318 0.033 10.918 0.039 10.802 0.039 4992.75 0.864 11.441 0.041 10.987 0.033 10.896 0.036 4997.78 0.997 11.208 0.021 10.840 0.028 10.763 0.046 5058.63 0.617 11.188 0.017 10.825 0.028 10.724 0.027 5061.57 0.695 11.310 0.032 11.064 0.015 11.001 0.023 5085.77 0.339 11.243 0.042 11.029 0.035 10.953 0.028 5086.65 0.362 11.257 0.032 11.009 0.026 10.926 0.031 5087.71 0.391 11.237 0.029 10.974 0.031 10.898 0.039 5088.64 0.416 11.185 0.023 10.921 0.019 10.851 0.035 5090.61 0.468 11.167 0.020 10.873 0.025 10.782 0.035 5092.61 0.521 11.578 0.027 11.128 0.026 11.005 0.025 5376.79 0.083 11.629 0.036 11.217 0.024 11.099 0.030 5378.76 0.136 11.361 0.016 10.941 0.016 10.839 0.017 5408.64 0.931 11.525 0.022 11.085 0.023 10.965 0.027 5412.64 0.037