Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV911

J œm H œm Ks œm JD � 2445000 Phase

12.971 0.043 12.519 0.030 12.374 0.051 4342.77 0.093 13.050 0.024 12.667 0.035 12.547 0.033 4651.74 0.298 12.868 0.047 12.413 0.026 12.310 0.027 4758.68 0.982 13.102 0.021 12.671 0.024 12.547 0.029 4761.62 0.194 12.746 0.042 12.417 0.044 12.322 0.044 4962.77 0.649 12.753 0.040 12.352 0.042 12.262 0.051 4964.74 0.791 12.775 0.042 12.347 0.044 12.239 0.052 4965.70 0.860 12.831 0.042 12.391 0.042 12.251 0.044 4966.75 0.935 12.775 0.033 12.486 0.034 12.376 0.039 5003.76 0.595 12.725 0.024 12.357 0.030 12.264 0.042 5005.73 0.737 12.765 0.050 12.511 0.039 12.412 0.060 5030.72 0.532 13.076 0.029 12.666 0.036 12.568 0.033 5056.85 0.410 12.737 0.026 12.505 0.018 12.409 0.019 5057.86 0.483 12.729 0.018 12.370 0.025 12.292 0.028 5060.60 0.680 12.928 0.021 12.477 0.016 12.383 0.028 5065.60 0.040 13.099 0.024 12.706 0.028 12.609 0.035 5068.58 0.253 12.726 0.032 12.469 0.027 12.430 0.021 5086.88 0.568 12.718 0.032 12.401 0.028 12.309 0.032 5087.67 0.626 12.897 0.021 12.442 0.023 12.328 0.026 5120.61 0.993 13.076 0.043 12.610 0.051 12.471 0.046 5122.57 0.133 13.097 0.021 12.734 0.021 12.626 0.026 5125.56 0.349 12.764 0.024 12.369 0.021 12.248 0.035 5410.62 0.834 12.849 0.026 12.399 0.028 12.282 0.035 5411.65 0.908 12.933 0.026 12.471 0.027 12.331 0.029 5412.65 0.980 13.087 0.031 12.663 0.032 12.565 0.038 5415.77 0.204