Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV914

J œm H œm Ks œm JD � 2445000 Phase

13.654 0.036 13.281 0.051 13.139 0.080 4342.81 0.268 13.523 0.028 13.211 0.019 13.123 0.025 4642.79 0.873 13.534 0.030 13.245 0.034 13.159 0.042 5027.79 0.837 13.806 0.035 13.471 0.038 13.359 0.040 5032.83 0.569 13.716 0.023 13.372 0.031 13.309 0.034 5053.73 0.607 13.470 0.021 13.255 0.021 13.168 0.020 5054.73 0.752 13.574 0.022 13.231 0.024 13.158 0.027 5056.77 0.048 13.608 0.027 13.245 0.028 13.194 0.026 5057.76 0.193 13.528 0.039 13.217 0.032 13.142 0.025 5083.78 0.976 13.567 0.032 13.224 0.060 13.165 0.034 5084.80 0.124 13.675 0.034 13.290 0.023 13.216 0.031 5085.77 0.265 13.719 0.037 13.329 0.029 13.264 0.027 5086.66 0.394 13.796 0.033 13.431 0.029 13.348 0.044 5087.67 0.541 13.505 0.046 13.260 0.047 13.174 0.046 5377.88 0.725 13.573 0.054 13.319 0.045 13.251 0.048 5378.86 0.867 13.598 0.031 13.257 0.037 13.180 0.030 5413.81 0.949 13.620 0.032 13.256 0.030 13.169 0.028 5415.75 0.230 13.768 0.038 13.346 0.036 13.263 0.031 5416.76 0.378 13.852 0.039 13.472 0.025 13.410 0.027 5417.76 0.522 13.613 0.023 13.356 0.023 13.312 0.029 5418.76 0.667 13.492 0.023 13.232 0.023 13.170 0.031 5419.75 0.812