Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV932

J œm H œm Ks œm JD � 2445000 Phase

12.825 0.042 12.403 0.044 12.298 0.044 4963.78 0.762 12.887 0.044 12.459 0.044 12.419 0.044 4964.75 0.835 12.956 0.046 12.531 0.046 12.410 0.046 4965.71 0.907 13.013 0.043 12.654 0.044 12.566 0.042 4967.73 0.059 12.635 0.052 12.440 0.046 12.342 0.049 4997.80 0.323 12.677 0.041 12.348 0.041 12.272 0.037 4999.82 0.475 12.688 0.033 12.341 0.039 12.272 0.050 5027.69 0.574 13.048 0.031 12.614 0.040 12.506 0.046 5032.81 0.960 12.747 0.020 12.354 0.018 12.270 0.021 5055.81 0.691 13.067 0.021 12.654 0.023 12.547 0.036 5059.65 0.980 12.977 0.042 12.672 0.035 12.593 0.031 5061.68 0.134 12.994 0.034 12.613 0.027 12.501 0.025 5086.67 0.015 12.969 0.035 12.632 0.029 12.561 0.042 5087.68 0.091 13.015 0.035 12.676 0.034 12.579 0.040 5088.61 0.161 12.845 0.021 12.587 0.030 12.496 0.029 5089.62 0.237 12.863 0.052 12.419 0.052 12.296 0.052 5375.82 0.787 12.909 0.023 12.606 0.023 12.512 0.034 5381.72 0.232 12.699 0.021 12.444 0.025 12.344 0.027 5383.67 0.378 12.677 0.021 12.386 0.024 12.309 0.033 5384.66 0.453 12.698 0.029 12.348 0.033 12.271 0.024 5385.74 0.535 12.706 0.033 12.346 0.029 12.238 0.029 5386.69 0.606 12.704 0.023 12.409 0.023 12.335 0.034 5410.63 0.408 12.719 0.029 12.344 0.027 12.243 0.034 5413.71 0.640 12.769 0.027 12.363 0.027 12.270 0.034 5414.74 0.718 12.937 0.038 12.510 0.037 12.378 0.027 5416.77 0.871