Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV953

J œm H œm Ks œm JD � 2445000 Phase

10.778 0.031 10.332 0.033 10.258 0.035 4289.82 0.576 10.831 0.022 10.399 0.017 10.243 0.024 4343.57 0.699 10.987 0.056 10.617 0.042 10.542 0.041 4405.59 0.994 .... .... 10.469 0.021 10.379 0.023 4651.78 0.135 10.661 0.051 10.303 0.034 10.178 0.038 4666.82 0.449 10.659 0.023 10.273 0.015 10.176 0.016 4668.81 0.490 10.684 0.026 10.272 0.016 10.168 0.020 4669.78 0.510 10.681 0.024 10.289 0.023 10.174 0.016 4670.83 0.532 10.755 0.038 10.348 0.017 10.241 0.018 4675.63 0.633 10.679 0.033 10.391 0.040 10.283 0.040 4992.76 0.255 10.638 0.042 10.302 0.042 10.199 0.042 4995.77 0.318 10.626 0.039 10.277 0.039 10.196 0.039 4999.82 0.402 10.860 0.034 10.582 0.036 10.481 0.051 5030.73 0.048 10.731 0.031 10.494 0.036 10.399 0.037 5032.63 0.087 10.757 0.021 10.324 0.020 10.230 0.035 5059.62 0.651 10.904 0.027 10.458 0.031 10.345 0.027 5065.61 0.776 10.948 0.035 10.539 0.040 10.411 0.037 5068.59 0.838 10.759 0.038 10.495 0.021 10.403 0.021 5083.88 0.157 10.719 0.036 10.427 0.021 10.359 0.033 5085.78 0.197 11.032 0.034 10.610 0.038 10.519 0.042 5121.56 0.944 10.677 0.027 10.356 0.029 10.274 0.029 5376.79 0.274 10.679 0.035 10.348 0.026 10.235 0.027 5379.72 0.335 10.642 0.020 10.285 0.018 10.170 0.025 5384.67 0.438 11.060 0.020 10.650 0.022 10.525 0.026 5410.64 0.981