Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV955

J œm H œm Ks œm JD � 2445000 Phase

12.736 0.017 12.426 0.020 12.340 0.023 4343.58 0.313 12.652 0.023 12.254 0.022 12.139 0.033 4651.78 0.757 12.509 0.040 12.295 0.041 12.225 0.044 4962.78 0.405 12.553 0.044 12.264 0.044 12.183 0.047 4964.76 0.549 12.509 0.041 12.189 0.046 12.162 0.043 4965.72 0.620 12.550 0.040 12.244 0.042 12.165 0.044 4966.75 0.695 12.673 0.042 12.191 0.041 12.122 0.047 4995.79 0.809 12.788 0.042 12.346 0.035 12.216 0.037 4997.80 0.956 12.900 0.042 12.520 0.047 12.434 0.039 4999.85 0.105 12.912 0.030 12.494 0.036 12.458 0.042 5027.70 0.133 12.868 0.025 12.446 0.019 12.350 0.029 5053.86 0.038 12.857 0.016 12.520 0.019 12.414 0.019 5056.85 0.256 12.799 0.021 12.372 0.022 12.244 0.024 5066.59 0.965 12.871 0.038 12.539 0.020 12.415 0.019 5083.83 0.221 12.840 0.028 12.485 0.051 12.394 0.031 5084.81 0.292 .... .... 12.367 0.020 12.271 0.023 5085.78 0.363 12.564 0.032 12.278 0.028 12.202 0.033 5087.69 0.502 12.537 0.030 12.230 0.030 12.161 0.038 5088.65 0.572 12.672 0.021 12.277 0.025 12.171 0.037 5092.62 0.861 12.670 0.018 12.262 0.019 12.157 0.023 5380.77 0.845 12.893 0.016 12.453 0.017 12.349 0.016 5383.68 0.056 12.489 0.016 12.290 0.023 12.224 0.033 5388.69 0.421 12.792 0.016 12.346 0.022 12.250 0.033 5409.77 0.956 12.497 0.026 12.277 0.027 12.206 0.027 5415.80 0.396