Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV971

J œm H œm Ks œm JD � 2445000 Phase

13.389 0.036 12.993 0.030 12.882 0.017 4343.58 0.204 13.094 0.036 12.759 0.037 12.674 0.028 4645.82 0.714 13.166 0.028 12.800 0.033 12.733 0.042 5027.87 0.808 13.408 0.032 12.966 0.035 12.911 0.047 5030.75 0.118 13.209 0.030 12.927 0.036 12.849 0.042 5032.84 0.343 13.115 0.023 12.765 0.021 12.704 0.024 5053.86 0.603 13.218 0.021 12.827 0.021 12.747 0.024 5056.77 0.917 13.300 0.030 12.897 0.026 12.802 0.023 5057.78 0.025 13.335 0.036 12.930 0.034 12.853 0.037 5086.67 0.133 13.351 0.034 12.982 0.030 12.907 0.035 5087.70 0.244 13.182 0.033 12.892 0.034 12.821 0.042 5088.65 0.346 13.061 0.038 12.785 0.039 12.745 0.038 5377.88 0.455 13.180 0.047 12.840 0.037 12.739 0.040 5378.85 0.560 13.286 0.029 12.988 0.031 12.931 0.028 5413.82 0.322 13.106 0.027 12.828 0.032 12.734 0.026 5414.78 0.425 13.209 0.029 12.818 0.020 12.757 0.020 5418.81 0.858 13.248 0.022 12.860 0.021 12.756 0.024 5419.81 0.965 13.132 0.020 12.778 0.020 12.685 0.024 5436.61 0.773 13.222 0.022 12.810 0.022 12.726 0.032 5438.57 0.984 13.371 0.030 12.938 0.025 12.839 0.034 5439.56 0.090 13.417 0.028 13.020 0.039 12.963 0.037 5440.56 0.198 13.114 0.025 12.782 0.025 12.706 0.025 5444.63 0.635 13.101 0.025 12.767 0.023 12.669 0.026 5445.56 0.736 13.226 0.024 12.832 0.025 12.745 0.028 5446.58 0.846