Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID HV997

J œm H œm Ks œm JD � 2445000 Phase

13.147 0.017 12.694 0.034 12.559 0.016 4343.60 0.387 13.121 0.073 12.735 0.054 12.667 0.057 4410.60 0.483 12.824 0.023 12.434 0.022 12.313 0.023 4651.80 0.830 12.989 0.029 12.534 0.027 12.414 0.026 4760.66 0.110 12.919 0.042 12.611 0.054 12.558 0.043 4963.79 0.561 12.796 0.033 12.499 0.040 12.331 0.041 4992.78 0.765 12.897 0.040 .... .... .... .... 4995.79 0.994 13.210 0.048 12.738 0.041 12.655 0.050 4999.85 0.303 12.816 0.023 12.515 0.035 12.398 0.033 5004.71 0.673 13.163 0.056 .... .... .... .... 5026.80 0.353 12.997 0.034 12.520 0.035 12.384 0.040 5088.62 0.055 13.109 0.027 12.654 0.022 12.520 0.037 5090.62 0.207 13.127 0.034 12.751 0.034 12.624 0.039 5120.66 0.493 12.883 0.052 12.455 0.052 12.321 0.052 5375.82 0.901 12.859 0.039 12.446 0.039 12.348 0.039 5376.78 0.974 12.891 0.028 12.435 0.028 12.327 0.031 5376.80 0.975 12.972 0.027 12.507 0.028 12.375 0.026 5377.68 0.042 12.934 0.038 12.476 0.039 12.353 0.038 5377.87 0.057 13.164 0.039 12.672 0.024 12.552 0.028 5379.73 0.198 13.117 0.044 12.661 0.037 .... .... 5379.88 0.209 13.189 0.024 12.739 0.023 12.600 0.028 5380.78 0.278 12.874 0.024 12.539 0.032 12.446 0.033 5385.75 0.656 12.843 0.032 12.510 0.025 12.379 0.019 5386.70 0.728 12.817 0.025 12.442 0.019 12.351 0.026 5387.69 0.803 12.919 0.024 12.626 0.020 12.518 0.030 5410.65 0.550 12.884 0.021 12.574 0.023 12.463 0.024 5437.76 0.612