Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID U11

J œm H œm Ks œm JD � 2445000 Phase

12.608 0.044 12.194 0.044 .... .... 4964.92 0.347 12.598 0.041 12.218 0.040 12.071 0.044 4967.91 0.496 12.228 0.028 11.886 0.027 11.776 0.038 5031.84 0.681 12.204 0.022 11.818 0.026 11.677 0.032 5033.83 0.780 12.302 0.023 11.841 0.031 11.746 0.046 5058.79 0.024 12.400 0.018 11.872 0.021 11.845 0.036 5059.79 0.073 12.430 0.020 11.913 0.029 11.910 0.028 5060.76 0.121 12.480 0.021 11.982 0.029 11.841 0.029 5061.71 0.169 12.503 0.034 12.157 0.034 12.083 0.039 5088.73 0.515 12.330 0.023 12.053 0.028 11.956 0.028 5089.79 0.568 12.286 0.026 11.999 0.024 11.863 0.039 5090.76 0.616 12.462 0.049 12.017 0.053 11.893 0.048 5122.66 0.205 12.593 0.023 12.145 0.025 12.045 0.029 5125.54 0.349 12.229 0.027 11.821 0.030 11.696 0.027 5376.85 0.869 12.241 0.027 11.809 0.029 11.695 0.027 5377.85 0.918 12.321 0.042 11.860 0.027 11.721 0.030 5378.86 0.969 12.244 0.025 11.863 0.025 11.769 0.026 5413.76 0.708 12.225 0.034 11.815 0.033 11.704 0.024 5416.62 0.850