Table 2. INFRARED PHOTOMETRY OF LMC CEPHEID U1

J œm H œm Ks œm JD � 2445000 Phase

12.168 0.040 11.782 0.040 11.649 0.046 4964.91 0.092 12.192 0.043 11.748 0.043 11.642 0.040 4966.91 0.181 12.547 0.042 12.035 0.034 11.888 0.036 4997.90 0.555 12.364 0.033 12.071 0.029 11.964 0.038 5003.88 0.820 12.246 0.022 11.908 0.030 11.805 0.039 5005.88 0.909 12.231 0.028 11.858 0.030 11.753 0.041 5030.64 0.006 12.215 0.020 11.755 0.027 11.621 0.045 5058.78 0.254 12.248 0.019 11.766 0.018 11.631 0.034 5059.78 0.298 12.310 0.018 11.797 0.026 11.665 0.028 5060.75 0.341 12.348 0.018 11.826 0.032 11.680 0.030 5061.71 0.383 12.412 0.035 11.947 0.025 11.812 0.018 5086.83 0.497 12.589 0.031 12.096 0.038 11.938 0.038 5088.72 0.581 12.626 0.018 12.131 0.028 12.004 0.026 5089.79 0.628 12.609 0.025 12.181 0.022 12.011 0.036 5090.75 0.671 12.664 0.022 12.206 0.022 12.050 0.025 5091.62 0.709 12.203 0.020 11.844 0.024 11.745 0.025 5120.55 0.992 12.458 0.034 11.943 0.027 11.809 0.023 5379.87 0.487 12.679 0.025 12.226 0.029 12.105 0.026 5385.84 0.752 12.237 0.016 11.895 0.021 11.767 0.025 5389.83 0.929 12.296 0.017 11.967 0.016 11.887 0.030 5410.82 0.859 12.173 0.016 11.790 0.015 11.662 0.018 5437.64 0.048